<?xml version="1.0" encoding="UTF-8"?>
<tileset version="1.10" tiledversion="1.11.0" name="HealOrb" tilewidth="16" tileheight="16" tilecount="1" columns="1">
 <image source="HealOrb.gif" trans="65ff00" width="16" height="16"/>
</tileset>
